I-9, r. 2

Règlement sur l’assurance responsabilité professionnelle des membres de l’Ordre des ingénieurs du Québec

Replaced on 04April 011 2013

chapter I-9, r. 2

Règlement sur l’assurance responsabilité professionnelle des membres de l’Ordre des ingénieurs du Québec

ENGINEERS — LIABILITY INSURANCE

Engineers Act

(chapter I-9, s. 7).

I-9

Professional Code

(chapter C-26, s. 93, par. d).

C-26

04April 011 2013